---
title: "Manual Configuration"
description: "Configure Codeflash for your project"
icon: "gear"
sidebarTitle: "Manual Configuration"
keywords:
  [
    "configuration",
    "setup",
    "settings",
  ]
---

# Manual Configuration

Codeflash is installed and configured on a per-project basis.
`codeflash init` should guide you through the configuration process, but if you need to manually configure Codeflash or set advanced settings, follow the guide for your language:

<CardGroup cols={2}>
  <Card title="Python Configuration" icon="python" href="/configuration/python">
    Configure via `pyproject.toml`
  </Card>
  <Card title="JavaScript / TypeScript Configuration" icon="js" href="/configuration/javascript">
    Configure via `package.json`
  </Card>
</CardGroup>